E ne rg y- B al an ce C he ck

10 -3 10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7 10 8 10 9

E ne rg y (e V )

10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7 10 8 Heating(eV-barns)

U p er li m it

E ne rg y- ba la nc e he at in g

Lo w er li m it

E ne rg y- B al an ce C he ck

0

50

10 0

15 0

20 0 *1 0^6

E ne rg y (e V )

0 5 10 15 20 25 30 *10 6 Heating(eV-barns)

U p er li m it

E ne rg y- ba la nc e he at in g

Lo w er li m it