74-W-0(N,TOT)

23-Nov-2004 12:04

EXFOR/WebLinux-0.1 Request: 2018/1, 2004-Nov-23 12:03:46

Incident Energy (MeV)

Cross Section (barns)

2001 Abfalterer 1971 Foster Jr 1958 Bratenahl